0 10 20 30 40 50 )c (GeV/ Tp 8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10 1 10

)c^{-1} (GeV

Tpdy/dN^2d

ALICE = 5.02 TeV NNs Pb, −Pb | < 0.5 y|

0 prompt D

0.8% BR syst. unc. not shown ±

0

10 20 30 40 50 )c (GeV/ Tp

8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10

1

10

)c^{-1}

(GeV

Tpdy/dN^2d

10% − Centrality 0 Pb−Pb 〉 _{AA} T〈× pp-reference syst. unc. AA T 3.2% ±

−

T ±

+ prompt D

)^{-1} 10 × 50% ( − Centrality 30 Pb−Pb 〉 _{AA} T〈× pp-reference syst. unc. AA T 3.7% ±

× − 〉 _{AA} T ±

1.7% BR syst. unc. not shown ±

+

10 20 30 40 50 )c (GeV/ Tp 8−10

7−10

6−10

5−10

4−10

3−10

2−10

1−10

1

10

)c^{-1}

(GeV

Tpdy/dN^2d

+ prompt D*

Filled markers: pp measured ref. -extrap. ref. Tp Open markers: pp

1.1% BR syst. unc. not shown ±

+

ALI-PUB-501916

ALI-PUB-501916